[#BloombergLP-bdlmt-ThreadPool-maxIdleTimeInterval]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/ThreadPool.adoc[ThreadPool]::maxIdleTimeInterval
:relfileprefix: ../../../
:mrdocs:

Return the amount of time a thread remains idle before being shut down when there are more than min threads started&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;threadpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval]
maxIdleTimeInterval() const;
----

== Return Value

the configured maximum idle time as a `TimeInterval`


[.small]#Created with https://www.mrdocs.com[MrDocs]#
