[#BloombergLP-bdlmt-Signaler_Node-synchronizeWait]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/Signaler_Node.adoc[Signaler&lowbar;Node]::synchronizeWait
:relfileprefix: ../../../
:mrdocs:

Block until all signals currently being emitted on the signaler have completed&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;signaler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
synchronizeWait() noexcept;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
