[#BloombergLP-bdlmt-MultiQueueThreadPool_Queue-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/MultiQueueThreadPool_Queue.adoc[MultiQueueThreadPool&lowbar;Queue]::reset
:relfileprefix: ../../../
:mrdocs:

Reset this queue to its initial state&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;multiqueuethreadpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----

== Description

Reset this queue to its initial state&period; The behavior is undefined unless this queue&apos;s lock is in an unlocked state&period; After this method returns, the object is ready for use as though it were a new object&period; Note that this method is not thread&hyphen;safe and is used by the object pool contained within `&ast;d&lowbar;multiQueueThreadPool&lowbar;p`&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
