[#BloombergLP-bdlmt-FixedThreadPool-isStarted]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/FixedThreadPool.adoc[FixedThreadPool]::isStarted
:relfileprefix: ../../../
:mrdocs:

Return `true` if `numThreads()` are started on this threadpool and `false` otherwise (indicating that 0 threads are started on this thread pool&period;)

== Synopsis

Declared in `&lt;bdlmt&lowbar;fixedthreadpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isStarted() const;
----

== Return Value

`true` if the configured number of threads are started, and `false` otherwise


[.small]#Created with https://www.mrdocs.com[MrDocs]#
