[#BloombergLP-bdlmt-EventScheduler-2constructor-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/EventScheduler.adoc[EventScheduler]::EventScheduler
:relfileprefix: ../../../
:mrdocs:

Create an event scheduler using the specified `clockType`&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;eventscheduler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
EventScheduler(
    xref:BloombergLP/bsls/SystemClockType/Enum.adoc[bsls::SystemClockType::Enum] clockType,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

== Description

Create an event scheduler using the default dispatcher functor (see &lcub;The Dispatcher Thread and the Dispatcher Functor&rcub; in the component&hyphen;level documentation) and using the specified `clockType` to indicate the epoch used for all time intervals (see &lcub;Supported Clock Types&rcub; in the component documentation)&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *clockType*
| clock used to interpret time intervals
| *basicAllocator*
| allocator used to supply memory
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
