[#BloombergLP-bdljsn-JsonObject-operator_assign-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdljsn.adoc[bdljsn]::xref:BloombergLP/bdljsn/JsonObject.adoc[JsonObject]::operator&equals;
:relfileprefix: ../../../
:mrdocs:

Assign to this object the value of the specified `rhs` object, and return a reference providing modifiable access to this object&period;

== Synopsis

Declared in `&lt;bdljsn&lowbar;json&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bdljsn/JsonObject.adoc[JsonObject]&
operator&equals;(xref:BloombergLP/bdljsn/JsonObject.adoc[JsonObject] const& rhs);
----

== Return Value

a reference providing modifiable access to this object

== Parameters

[cols="1,4"]
|===
| Name| Description
| *rhs*
| source object
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
