[#BloombergLP-bdldfp-operator_le-06f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::operator&lt;&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` has a value less than or equal the value of the specified `rhs` and `false` otherwise&period;

== Synopsis

Declared in `&lt;bdldfp&lowbar;decimal&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator&lt;&equals;(
    xref:BloombergLP/bdldfp/Decimal32.adoc[Decimal32] lhs,
    xref:BloombergLP/bdldfp/Decimal128.adoc[Decimal128] rhs);
----

== Description

The value of a decimal object `lhs` is less than or equal to the value of an object `rhs` if the `compareQuietLessEqual` operation (IEEE&hyphen;754 defined, non&hyphen;total ordering comparison) considers the underlying IEEE representation of `lhs` to be less or equal to that of `rhs`&period; In other words, `lhs` is less or equal than `rhs` if&colon;

&ast; neither `lhs` nor `rhs` are NaN, or &ast; `lhs` and `rhs` are both zero (positive or negative), or &ast; both `lhs` and `rhs` are positive infinity, or &ast; `lhs` is negative infinity, or &ast; `lhs` and `rhs` both represent a real number and the real number of `lhs` is less or equal to that of `rhs`

This operation stores the value of the macro `EDOM` into `errno` if either or both operands are signaling NaN&period;

== Return Value

`true` if the specified `lhs` has a value less than or equal the value of the specified `rhs` and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand operand
| *rhs*
| right&hyphen;hand operand
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
