[#BloombergLP-bdldfp-DecimalUtil-ceil-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::xref:BloombergLP/bdldfp/DecimalUtil.adoc[DecimalUtil]::ceil
:relfileprefix: ../../../
:mrdocs:

Same as the overload taking `Decimal64`&period;

== Synopsis

Declared in `&lt;bdldfp&lowbar;decimalutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/bdldfp/Decimal128.adoc[Decimal128]
ceil(xref:BloombergLP/bdldfp/Decimal128.adoc[Decimal128] x);
----

== Return Value

smallest integral value that is not less than `x`

== Parameters

[cols="1,4"]
|===
| Name| Description
| *x*
| value to round toward &plus;infinity
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
