[#BloombergLP-bdlde-operator_not_eq-053]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` checksums do not have the same value&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;crc64&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/bdlde/Crc64.adoc[Crc64] const& lhs,
    xref:BloombergLP/bdlde/Crc64.adoc[Crc64] const& rhs);
----

== Description

Return `true` if the specified `lhs` and `rhs` checksums do not have the same value, and `false` otherwise&period; Two checksums do not have the same value if the values obtained from their `checksum` methods differ&period;

== Return Value

`true` if `lhs` and `rhs` do not have the same value, and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand&hyphen;side checksum
| *rhs*
| right&hyphen;hand&hyphen;side checksum
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
