[#BloombergLP-bdlde-Utf8CheckingInStreamBufWrapper-_04enum]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/Utf8CheckingInStreamBufWrapper.adoc[Utf8CheckingInStreamBufWrapper]::Unnamed enum
:relfileprefix: ../../../
:mrdocs:

Error status values for seek failures&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;utf8checkinginstreambufwrapper&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Unnamed enum;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `k&lowbar;SEEK&lowbar;FAIL` 
| Seek failure indicator returned by this wrapper&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
