[#BloombergLP-bdlde-QuotedPrintableDecoder-s_defaultMaxLineLength]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/QuotedPrintableDecoder.adoc[QuotedPrintableDecoder]::s&lowbar;defaultMaxLineLength
:relfileprefix: ../../../
:mrdocs:

Default maximum line length used when configuring the decoder&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;quotedprintabledecoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const s&lowbar;defaultMaxLineLength;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
