[#BloombergLP-bdlde-QuotedPrintableDecoder-outputLength]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/QuotedPrintableDecoder.adoc[QuotedPrintableDecoder]::outputLength
:relfileprefix: ../../../
:mrdocs:

Return the total length of the output emitted thus far&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;quotedprintabledecoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
outputLength() const;
----

== Description

Return the total length of the output emitted by this decoder (possibly after several calls to the `convert` or the `input` methods) since its initial construction or the latest `reset`&period;

== Return Value

total length of the output emitted thus far


[.small]#Created with https://www.mrdocs.com[MrDocs]#
