[#BloombergLP-bdlc-operator_not_eq-014]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlc.adoc[bdlc]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` index clerks do not have the same value, and `false` otherwise&period;

== Synopsis

Declared in `&lt;bdlc&lowbar;indexclerk&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/bdlc/IndexClerk.adoc[IndexClerk] const& lhs,
    xref:BloombergLP/bdlc/IndexClerk.adoc[IndexClerk] const& rhs);
----

== Description

Two `IndexClerk` objects do not have the same value if they do not have the same `nextNewIndex()`, or might generate different sequences of integer indices&period;

== Return Value

`true` if not equal, and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand&hyphen;side index clerk
| *rhs*
| right&hyphen;hand&hyphen;side index clerk
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
