[#BloombergLP-bdlb-operator_not_eq-06e]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` do not have the same value&period;

== Synopsis

Declared in `&lt;bdlb&lowbar;bigendian&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/bdlb/BigEndianUint16.adoc[BigEndianUint16] const& lhs,
    xref:BloombergLP/bdlb/BigEndianUint16.adoc[BigEndianUint16] const& rhs);
----

== Description

Return `true` if the specified `lhs` and `rhs` `BigEndianUint16` objects do not have the same value, and `false` otherwise&period; Two `BigEndianUint16` objects do not have the same value if and only if the respective integral network byte&hyphen;order values that they represent do not have the same value&period;

== Return Value

`true` if `lhs` and `rhs` do not have the same value, and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand operand
| *rhs*
| right&hyphen;hand operand
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
