[#BloombergLP-bdlb-Tokenizer-reset-07]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::xref:BloombergLP/bdlb/Tokenizer.adoc[Tokenizer]::reset
:relfileprefix: ../../../
:mrdocs:

Rebind this object to refer to the specified sequence of `input` characters&period;

== Synopsis

Declared in `&lt;bdlb&lowbar;tokenizer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset(char const* input);
----

== Description

The state of the tokenizer following this call is _as_ _if_ it had been constructed with `input` and its current sets of _soft_ and _hard_ delimiter characters&period; The behavior is undefined if this object is used in any way (other than to reset or destroy it) after its underlying `input` string is modified&period; Note that supplying a default constructed `string&lowbar;view` is equivalent to supplying an empty c&hyphen;string (i&period;e&period;, &quot;&quot;)&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *input*
| null&hyphen;terminated character sequence to tokenize
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
