[#BloombergLP-bdlb-RandomDevice-size_t]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::xref:BloombergLP/bdlb/RandomDevice.adoc[RandomDevice]::size&lowbar;t
:relfileprefix: ../../../
:mrdocs:

Alias for `bsls&colon;&colon;Types&colon;&colon;size&lowbar;type`, used for buffer sizes&period;

== Synopsis

Declared in `&lt;bdlb&lowbar;randomdevice&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef xref:BloombergLP/bsls/Types/size_type.adoc[bsls::Types::size&lowbar;type] size&lowbar;t;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
