[#BloombergLP-bdlb-RandomDevice-getRandomBytes]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::xref:BloombergLP/bdlb/RandomDevice.adoc[RandomDevice]::getRandomBytes
:relfileprefix: ../../../
:mrdocs:

Load random bytes from the system random number generator&period;

== Synopsis

Declared in `&lt;bdlb&lowbar;randomdevice&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int
getRandomBytes(
    unsigned char* buffer,
    xref:BloombergLP/bdlb/RandomDevice/size_t.adoc[size&lowbar;t] numBytes);
----

== Description

Read the specified `numBytes` from the system random number generator into the specified `buffer`&period; Note that this method may block if called repeatedly or if `numBytes` is high&period;

== Return Value

0 on success, and a non&hyphen;zero value otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *buffer*
| buffer to receive the random bytes
| *numBytes*
| number of bytes to read into `buffer`
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
