[#BloombergLP-bdlb-Print-singleLineHexDump-05]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::xref:BloombergLP/bdlb/Print.adoc[Print]::singleLineHexDump
:relfileprefix: ../../../
:mrdocs:

`singleLineHexDump` overloads

== Synopses

Declared in `&lt;bdlb&lowbar;print&period;h&gt;`

Print a contiguous byte range as uppercase hex on a single line&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
std::ostream&
xref:BloombergLP/bdlb/Print/singleLineHexDump-0cb.adoc[singleLineHexDump](
    std::ostream& stream,
    char const* begin,
    char const* end);
----

[.small]#xref:BloombergLP/bdlb/Print/singleLineHexDump-0cb.adoc[_» more&period;&period;&period;_]#

Print a buffer as uppercase hex on a single line&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
std::ostream&
xref:BloombergLP/bdlb/Print/singleLineHexDump-02.adoc[singleLineHexDump](
    std::ostream& stream,
    char const* buffer,
    int length);
----

[.small]#xref:BloombergLP/bdlb/Print/singleLineHexDump-02.adoc[_» more&period;&period;&period;_]#

Print a byte sequence as uppercase hex on a single line&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class INPUT&lowbar;ITERATOR&gt;
static
std::ostream&
xref:BloombergLP/bdlb/Print/singleLineHexDump-0c5.adoc[singleLineHexDump](
    std::ostream& stream,
    INPUT&lowbar;ITERATOR begin,
    INPUT&lowbar;ITERATOR end);
----

[.small]#xref:BloombergLP/bdlb/Print/singleLineHexDump-0c5.adoc[_» more&period;&period;&period;_]#

== Return Value

a reference to `stream`

== Parameters

[cols="1,4"]
|===
| Name| Description
| *stream*
| the output stream
| *begin*
| pointer to the first byte
| *end*
| pointer past the last byte
| *buffer*
| the memory buffer to dump
| *length*
| the length of `buffer` in bytes
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
