[#BloombergLP-bdlb-DoubleCompareUtil-k_DEFAULT_ABSOLUTE_TOLERANCE]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::xref:BloombergLP/bdlb/DoubleCompareUtil.adoc[DoubleCompareUtil]::k&lowbar;DEFAULT&lowbar;ABSOLUTE&lowbar;TOLERANCE
:relfileprefix: ../../../
:mrdocs:

Default absolute tolerance used by fuzzy comparison functions&period;

== Synopsis

Declared in `&lt;bdlb&lowbar;doublecompareutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
double const k&lowbar;DEFAULT&lowbar;ABSOLUTE&lowbar;TOLERANCE;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
