[#BloombergLP-bdema_Default]
= xref:BloombergLP.adoc[BloombergLP]::bdema&lowbar;Default
:relfileprefix: ../
:mrdocs:

This `struct` is a namespace for functions that manipulate and access the default and global allocator pointers&period; This alias is defined for backward compatibility&period;

== Synopsis

Declared in `&lt;bslma&lowbar;default&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef xref:BloombergLP/bslma/Default.adoc[bslma::Default] bdema&lowbar;Default;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
