[#BloombergLP-balxml-operator_not_eq-0d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return true if the specified `lhs` object does not have the same value as the specified `rhs` object&period;

== Synopsis

Declared in `&lt;balxml&lowbar;errorinfo&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/balxml/ErrorInfo.adoc[ErrorInfo] const& lhs,
    xref:BloombergLP/balxml/ErrorInfo.adoc[ErrorInfo] const& rhs);
----

== Description

The two objects have the same value if `severity()`, `lineNumber()`, `columnNumber()`, `source()`, and `message()` return equal values for both&period;

== Return Value

`true` if the objects do not have the same value, and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand operand
| *rhs*
| right&hyphen;hand operand
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
