[#BloombergLP-balxml-Reader-errorInfo]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/Reader.adoc[Reader]::errorInfo
:relfileprefix: ../../../
:mrdocs:

Return a reference to the non&hyphen;modifiable error information for this reader&period; The returned value becomes invalid when `close` is called or the reader is destroyed&period;

== Synopsis

Declared in `&lt;balxml&lowbar;reader&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
xref:BloombergLP/balxml/ErrorInfo.adoc[ErrorInfo] const&
errorInfo() const = 0;
----

== Return Value

a reference to the non&hyphen;modifiable error information for this reader


[.small]#Created with https://www.mrdocs.com[MrDocs]#
