[#BloombergLP-balxml-MiniReader-2constructor-03]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/MiniReader.adoc[MiniReader]::MiniReader
:relfileprefix: ../../../
:mrdocs:

Construct a reader using the optionally specified `basicAllocator`&period;

== Synopsis

Declared in `&lt;balxml&lowbar;minireader&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
MiniReader(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

== Description

The instantiated MiniReader will utilize a default memory buffer while reading the input document&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *basicAllocator*
| memory allocator used to supply memory
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
