[#BloombergLP-balxml-ErrorInfo-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/ErrorInfo.adoc[ErrorInfo]::reset
:relfileprefix: ../../../
:mrdocs:

Reset this object to initial state, as if it were default constructed&period;

== Synopsis

Declared in `&lt;balxml&lowbar;errorinfo&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
