[#BloombergLP-balxml-ErrorInfo-isError]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/ErrorInfo.adoc[ErrorInfo]::isError
:relfileprefix: ../../../
:mrdocs:

Return true if the `severity() &equals;&equals; `BAEXML&lowbar;ERROR&apos; and false otherwise&period;

== Synopsis

Declared in `&lt;balxml&lowbar;errorinfo&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isError() const;
----

== Return Value

`true` if the severity is an error, and `false` otherwise


[.small]#Created with https://www.mrdocs.com[MrDocs]#
