[#BloombergLP-balxml-EncoderOptions-DEFAULT_INITIALIZER_SPACES_PER_LEVEL]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/EncoderOptions.adoc[EncoderOptions]::DEFAULT&lowbar;INITIALIZER&lowbar;SPACES&lowbar;PER&lowbar;LEVEL
:relfileprefix: ../../../
:mrdocs:

Default initial value for `spacesPerLevel`&period;

== Synopsis

Declared in `&lt;balxml&lowbar;encoderoptions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const DEFAULT&lowbar;INITIALIZER&lowbar;SPACES&lowbar;PER&lowbar;LEVEL;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
