[#BloombergLP-balxml-DecoderOptions-DEFAULT_INITIALIZER_SKIP_UNKNOWN_ELEMENTS]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/DecoderOptions.adoc[DecoderOptions]::DEFAULT&lowbar;INITIALIZER&lowbar;SKIP&lowbar;UNKNOWN&lowbar;ELEMENTS
:relfileprefix: ../../../
:mrdocs:

Default initial value for `skipUnknownElements`&period;

== Synopsis

Declared in `&lt;balxml&lowbar;decoderoptions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool const DEFAULT&lowbar;INITIALIZER&lowbar;SKIP&lowbar;UNKNOWN&lowbar;ELEMENTS;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
