[#BloombergLP-balxml-DecoderOptions-DEFAULT_INITIALIZER_MAX_DEPTH]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/DecoderOptions.adoc[DecoderOptions]::DEFAULT&lowbar;INITIALIZER&lowbar;MAX&lowbar;DEPTH
:relfileprefix: ../../../
:mrdocs:

Default initial value for `maxDepth` (512)&period;

== Synopsis

Declared in `&lt;balxml&lowbar;decoderoptions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const DEFAULT&lowbar;INITIALIZER&lowbar;MAX&lowbar;DEPTH;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
