[#BloombergLP-balxml-Decoder-warningCount]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/Decoder.adoc[Decoder]::warningCount
:relfileprefix: ../../../
:mrdocs:

Return the number of warnings that occurred during decoding&period; This number is reset to zero on a call to `open`&period;

== Synopsis

Declared in `&lt;balxml&lowbar;decoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
warningCount() const;
----

== Return Value

number of warnings that occurred during decoding


[.small]#Created with https://www.mrdocs.com[MrDocs]#
