[#BloombergLP-balxml-Decoder-errorSeverity]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/Decoder.adoc[Decoder]::errorSeverity
:relfileprefix: ../../../
:mrdocs:

Return the severity of the most severe warning or error encountered during the last call to the `decode` method&period; The severity is reset each time `decode` is called&period;

== Synopsis

Declared in `&lt;balxml&lowbar;decoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/balxml/ErrorInfo/Severity-0f.adoc[ErrorInfo::Severity]
errorSeverity() const;
----

== Return Value

severity of the most severe warning or error from the last `decode` call


[.small]#Created with https://www.mrdocs.com[MrDocs]#
