[#BloombergLP-baltzo-TestLoader-2constructor-0d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/baltzo.adoc[baltzo]::xref:BloombergLP/baltzo/TestLoader.adoc[TestLoader]::TestLoader
:relfileprefix: ../../../
:mrdocs:

Create a `TestLoader` object&period;

== Synopsis

Declared in `&lt;baltzo&lowbar;testloader&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
TestLoader();
----

== Description

Optionally specify an `allocator` (e&period;g&period;, the address of a `bslma&colon;&colon;Allocator` object) to supply memory&semi; otherwise, the default allocator is used&period; By default the test loader will return `ErrorCode&colon;&colon;k&lowbar;UNSUPPORTED&lowbar;ID` for all time&hyphen;zone identifiers&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
