[#BloombergLP-balst-StackTraceTestAllocator-release]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceTestAllocator.adoc[StackTraceTestAllocator]::release
:relfileprefix: ../../../
:mrdocs:

Deallocate all memory held by this allocator&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktracetestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
virtual
void
release() override;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
