[#BloombergLP-balm-MetricRecord-2constructor-06]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/MetricRecord.adoc[MetricRecord]::MetricRecord
:relfileprefix: ../../../
:mrdocs:

Create a metric record having default values for its metric `metricId`, `count`, `total`, `min`, and `max` attributes&period;

== Synopsis

Declared in `&lt;balm&lowbar;metricrecord&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
MetricRecord();
----

== Description

The default `metricId` is the invalid id value, the default `count` is 0, the default `total` is 0&period;0, the default `min` is the defined `k&lowbar;DEFAULT&lowbar;MIN` constant (the representation for positive infinity), and the default `max` is the defined `k&lowbar;DEFAULT&lowbar;MAX` constant (the representation for negative infinity)&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
