[#BloombergLP-balm-IntegerCollector-DEFAULT_MIN]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/IntegerCollector.adoc[IntegerCollector]::DEFAULT&lowbar;MIN
:relfileprefix: ../../../
:mrdocs:

Deprecated alias for `k&lowbar;DEFAULT&lowbar;MIN`&period;

== Synopsis

Declared in `&lt;balm&lowbar;integercollector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const DEFAULT&lowbar;MIN;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
