[#BloombergLP-balm-DefaultMetricsManager-instance]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/DefaultMetricsManager.adoc[DefaultMetricsManager]::instance
:relfileprefix: ../../../
:mrdocs:

Return the default instance of the `MetricsManager` or 0 if the default instance has not yet been created or has already been destroyed&period;

== Synopsis

Declared in `&lt;balm&lowbar;defaultmetricsmanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
xref:BloombergLP/balm/MetricsManager.adoc[MetricsManager]*
instance();
----

== Return Value

address of the default `MetricsManager`, or 0 if none exists


[.small]#Created with https://www.mrdocs.com[MrDocs]#
