[#BloombergLP-ball-Severity-streamOut]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/Severity.adoc[Severity]::streamOut
:relfileprefix: ../../../
:mrdocs:

Format the specified `value` to the specified output `stream` and return a reference to the modifiable `stream`&period;

== Synopsis

Declared in `&lt;ball&lowbar;severity&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
std::ostream&
streamOut(
    std::ostream& stream,
    xref:BloombergLP/ball/Severity/Level.adoc[Severity::Level] value);
----

== Return Value

reference to the modifiable `stream`

== Parameters

[cols="1,4"]
|===
| Name| Description
| *stream*
| output stream
| *value*
| severity level to format
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
