[#BloombergLP-baljsn-JsonTokenizer-get_allocator]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/baljsn.adoc[baljsn]::xref:BloombergLP/baljsn/JsonTokenizer.adoc[JsonTokenizer]::get&lowbar;allocator
:relfileprefix: ../../../
:mrdocs:

Return the allocator used by this object to supply memory&period;

== Synopsis

Declared in `&lt;baljsn&lowbar;jsontokenizer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/baljsn/JsonTokenizer/allocator_type.adoc[JsonTokenizer::allocator&lowbar;type]
get&lowbar;allocator() const;
----

== Description

Note that if no allocator was supplied at construction the default allocator in effect at construction is used&period;

== Return Value

the allocator used by this object to supply memory


[.small]#Created with https://www.mrdocs.com[MrDocs]#
