[#BloombergLP-baljsn-EncoderTestSequenceWithAllCategories-2constructor-0a]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/baljsn.adoc[baljsn]::xref:BloombergLP/baljsn/EncoderTestSequenceWithAllCategories.adoc[EncoderTestSequenceWithAllCategories]::EncoderTestSequenceWithAllCategories
:relfileprefix: ../../../
:mrdocs:

Create an object of type `EncoderTestSequenceWithAllCategories` having the default value&period;

== Synopsis

Declared in `&lt;baljsn&lowbar;encoder&lowbar;testtypes&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
EncoderTestSequenceWithAllCategories(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

== Description

Use the optionally specified &apos;basicAllocator&apos; to supply memory&period; If &apos;basicAllocator&apos; is 0, the currently installed default allocator is used&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *basicAllocator*
| memory allocator&semi; null uses the default
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
