[#BloombergLP-baljsn-EncoderOptions-DEFAULT_INITIALIZER_MAX_FLOAT_PRECISION]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/baljsn.adoc[baljsn]::xref:BloombergLP/baljsn/EncoderOptions.adoc[EncoderOptions]::DEFAULT&lowbar;INITIALIZER&lowbar;MAX&lowbar;FLOAT&lowbar;PRECISION
:relfileprefix: ../../../
:mrdocs:

Default value for the `maxFloatPrecision` attribute&period;

== Synopsis

Declared in `&lt;baljsn&lowbar;encoderoptions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const DEFAULT&lowbar;INITIALIZER&lowbar;MAX&lowbar;FLOAT&lowbar;PRECISION;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
