[#BloombergLP-balcl-OptionValue-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balcl.adoc[balcl]::xref:BloombergLP/balcl/OptionValue.adoc[OptionValue]::reset
:relfileprefix: ../../../
:mrdocs:

Reset this object to its default constructed (unset) state&period; The existing value, if any, is destroyed&period; Note that on return `OptionType&colon;&colon;e&lowbar;VOID &equals;&equals; type()`&period;

== Synopsis

Declared in `&lt;balcl&lowbar;optionvalue&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
