[#BloombergLP-balb-RateLimiter-resetStatistics]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/RateLimiter.adoc[RateLimiter]::resetStatistics
:relfileprefix: ../../../
:mrdocs:

Reset the statistics collected for this rate limiter&period;

== Synopsis

Declared in `&lt;balb&lowbar;ratelimiter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
resetStatistics();
----

== Description

Reset the statics collected for this rate limiter by setting the number of units used and the number of units submitted to 0, and set the `statisticsCollectionStartTime` to the `lastUpdateTime` of this leaky bucket&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
