[#BloombergLP-balb-RateLimiter-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/RateLimiter.adoc[RateLimiter]::reset
:relfileprefix: ../../../
:mrdocs:

Reset the statistics counter for this rate limiter to 0, and set the `lastUpdateTime` of this rate limiter to the specified `currentTime`&period;

== Synopsis

Declared in `&lt;balb&lowbar;ratelimiter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset(xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval] const& currentTime);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *currentTime*
| new `lastUpdateTime` for this rate limiter
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
