[#BloombergLP-balb-PerformanceMonitor-resetStatistics]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PerformanceMonitor.adoc[PerformanceMonitor]::resetStatistics
:relfileprefix: ../../../
:mrdocs:

Reset the min, max, and average statistics for each monitored process&period;

== Synopsis

Declared in `&lt;balb&lowbar;performancemonitor&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
resetStatistics();
----

== Description

Note that this method will call `collect` once for each monitored process, so the statistics after this method returns will be based on the values collected thereby&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
