[#BSLMT_TESTUTIL_T_]
= BSLMT&lowbar;TESTUTIL&lowbar;T&lowbar;
:mrdocs:

Print tab (w&sol;o newline)&period; Do not put in a `do &lcub;&rcub; while(false)`, as this macro is intended to be called without a terminating `&semi;`&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;testutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define BSLMT&lowbar;TESTUTIL&lowbar;T&lowbar;

----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
