[#absl-uniform_real_distribution-reset]
= xref:absl.adoc[absl]::xref:absl/uniform_real_distribution.adoc[uniform&lowbar;real&lowbar;distribution]::reset
:relfileprefix: ../../
:mrdocs:

Resets the uniform real distribution&period;

== Synopsis

Declared in `&lt;absl&sol;random&sol;uniform&lowbar;real&lowbar;distribution&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----

== Description

Note that this function has no effect because the distribution already produces independent values&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
