[#absl-internal_stacktrace-GetStackTraceNoFixup]
= xref:absl.adoc[absl]::xref:absl/internal_stacktrace.adoc[internal&lowbar;stacktrace]::GetStackTraceNoFixup
:relfileprefix: ../../
:mrdocs:

Same as `GetStackTrace()`, but skips fix&hyphen;ups for efficiency&period;

== Synopsis

Declared in `&lt;absl&sol;debugging&sol;stacktrace&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
extern
int
GetStackTraceNoFixup(
    void** result,
    int max&lowbar;depth,
    int skip&lowbar;count);
----

== Return Value

The number of frames stored in `result`&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *result*
| Buffer to receive the recorded program counter values&period;
| *max&lowbar;depth*
| Maximum number of frames to record&period;
| *skip&lowbar;count*
| Number of most recent stack frames to skip&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
