[#absl-chunked_queue-shrink_to_fit]
= xref:absl.adoc[absl]::xref:absl/chunked_queue.adoc[chunked&lowbar;queue]::shrink&lowbar;to&lowbar;fit
:relfileprefix: ../../
:mrdocs:

Requests the removal of unused capacity&period;

== Synopsis

Declared in `&lt;absl&sol;container&sol;chunked&lowbar;queue&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
shrink&lowbar;to&lowbar;fit();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
