[#absl-chunked_queue-kBlockSizeMax]
= xref:absl.adoc[absl]::xref:absl/chunked_queue.adoc[chunked&lowbar;queue]::kBlockSizeMax
:relfileprefix: ../../
:mrdocs:

The maximum block size, in elements&period;

== Synopsis

Declared in `&lt;absl&sol;container&sol;chunked&lowbar;queue&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
size&lowbar;t kBlockSizeMax = (BLo &equals;&equals; 0 &amp;&amp; BHi &equals;&equals; 0) ? 128 &colon; BHi;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
