[#absl-StderrThreshold]
= xref:absl.adoc[absl]::StderrThreshold
:relfileprefix: ../
:mrdocs:

Returns the value of the Stderr Threshold parameter&period;

== Synopsis

Declared in `&lt;absl&sol;log&sol;globals&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;nodiscard&rsqb;&rsqb;
xref:absl/LogSeverityAtLeast.adoc[absl::LogSeverityAtLeast]
StderrThreshold();
----

== Description

This function is async&hyphen;signal&hyphen;safe&period;

== Return Value

The current stderr threshold&period;

[NOTE]
====
The return value https://en.cppreference.com/cpp/language/attributes/nodiscard[should not be discarded^].
====

[.small]#Created with https://www.mrdocs.com[MrDocs]#
