[#absl-Status-raw_code]
= xref:absl.adoc[absl]::xref:absl/Status.adoc[Status]::raw&lowbar;code
:relfileprefix: ../../
:mrdocs:

Returns a raw (canonical) error code corresponding to the enum value of `google&period;rpc&period;Code` definitions within https&colon;&sol;&sol;github&period;com&sol;googleapis&sol;googleapis&sol;blob&sol;master&sol;google&sol;rpc&sol;code&period;proto&period; These values could be out of the range of canonical `absl&colon;&colon;StatusCode` enum values&period;

== Synopsis

Declared in `&lt;absl&sol;status&sol;status&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
raw&lowbar;code() const;
----

== Description

NOTE&colon; This function should only be called when converting to an associated wire format&period; Use `Status&colon;&colon;code()` for error handling&period;

== Return Value

The raw error code&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
